X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/4ec55841b965ae33aad66479bf4d4ad41e6a0b62..3ed6fab9c3ec7ca31133e4d4c750d546727b1847:/services/workbench2/src/views/run-process-panel/inputs/file-input.tsx

diff --git a/services/workbench2/src/views/run-process-panel/inputs/file-input.tsx b/services/workbench2/src/views/run-process-panel/inputs/file-input.tsx
index 5f48f83784..6970e2a5b5 100644
--- a/services/workbench2/src/views/run-process-panel/inputs/file-input.tsx
+++ b/services/workbench2/src/views/run-process-panel/inputs/file-input.tsx
@@ -144,6 +144,7 @@ const FileInputComponent = connect()(
                                 includeCollections
                                 includeDirectories
                                 includeFiles
+                                cascadeSelection={false}
                                 options={this.props.options}
                                 toggleItemActive={this.setFile} />
                         </div>
