X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/4c394b5b01622c72318fc194682077aa304417fa..424f5418a6fd9f49baa1cc79bf0b51f9ab65ac58:/src/views/run-process-panel/run-process-panel.tsx?ds=sidebyside

diff --git a/src/views/run-process-panel/run-process-panel.tsx b/src/views/run-process-panel/run-process-panel.tsx
index f284ac7210..dd7b08509e 100644
--- a/src/views/run-process-panel/run-process-panel.tsx
+++ b/src/views/run-process-panel/run-process-panel.tsx
@@ -24,8 +24,8 @@ const mapDispatchToProps = (dispatch: Dispatch): RunProcessPanelRootActionProps
     onSetWorkflow: (workflow: WorkflowResource) => {
         dispatch<any>(setWorkflow(workflow));
     },
-    onRunProcess: () => {
-        
+    runProcess: () => {
+        console.log('run process!');
     }
 });
 
