X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/4927f812339c86a8d84354c4080c5a12a3d9ef2b..85836abe716b2403f3b7fe75c551e4ace3995157:/src/components/float-input/float-input.tsx

diff --git a/src/components/float-input/float-input.tsx b/src/components/float-input/float-input.tsx
index 16e18cb145..1b909306b3 100644
--- a/src/components/float-input/float-input.tsx
+++ b/src/components/float-input/float-input.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { Input } from '@material-ui/core';
 import { InputProps } from '@material-ui/core/Input';
 
