X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/48b6a6be504556c5624e505d18254cf144636dda..eb4491eea9ba873845f7a5796d139d19977f8112:/src/components/context-menu/context-menu.test.tsx

diff --git a/src/components/context-menu/context-menu.test.tsx b/src/components/context-menu/context-menu.test.tsx
index 5ced213a3f..faf05f1ff3 100644
--- a/src/components/context-menu/context-menu.test.tsx
+++ b/src/components/context-menu/context-menu.test.tsx
@@ -3,7 +3,7 @@
 // SPDX-License-Identifier: AGPL-3.0
 
 import * as React from "react";
-import { mount, configure, shallow } from "enzyme";
+import { mount, configure } from "enzyme";
 import * as Adapter from "enzyme-adapter-react-16";
 import { ContextMenu } from "./context-menu";
 import { ListItem } from "@material-ui/core";
