X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/48b6a6be504556c5624e505d18254cf144636dda..6f8dcb2b13f3058db656908fb26b09e23b527f08:/src/validators/max-length.tsx

diff --git a/src/validators/max-length.tsx b/src/validators/max-length.tsx
index 922e3e5270..370aa4c3a2 100644
--- a/src/validators/max-length.tsx
+++ b/src/validators/max-length.tsx
@@ -5,12 +5,6 @@
 export const ERROR_MESSAGE = 'Maximum string length of this field is: ';
 export const DEFAULT_MAX_VALUE = 60;
 
-interface MaxLengthProps {
-    maxLengthValue: number;  
-    defaultErrorMessage: string;
-}
-
-// TODO types for maxLength
 export const maxLength: any = (maxLengthValue = DEFAULT_MAX_VALUE, errorMessage = ERROR_MESSAGE) => {
     return (value: string) => {
         if (value) {
