X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/486b1bf637827063cdedef283907da2dcc63ad22..8fb6982f9d6d4e76cae9c8b16be36c16ce93c148:/src/views/link-panel/link-panel-root.tsx

diff --git a/src/views/link-panel/link-panel-root.tsx b/src/views/link-panel/link-panel-root.tsx
index b32208cd74..c24d463700 100644
--- a/src/views/link-panel/link-panel-root.tsx
+++ b/src/views/link-panel/link-panel-root.tsx
@@ -7,7 +7,6 @@ import { LINK_PANEL_ID } from 'store/link-panel/link-panel-actions';
 import { DataExplorer } from 'views-components/data-explorer/data-explorer';
 import { SortDirection } from 'components/data-table/data-column';
 import { DataColumns } from 'components/data-table/data-table';
-import { DataTableDefaultView } from 'components/data-table-default-view/data-table-default-view';
 import { ResourcesState } from 'store/resources/resources';
 import { ShareMeIcon } from 'components/icon/icon';
 import { createTree } from 'models/tree';
@@ -94,9 +93,7 @@ export const LinkPanelRoot = withStyles(styles)((props: LinkPanelRootProps) => {
         contextMenuColumn={true}
         hideColumnSelector
         hideSearchInput
-        dataTableDefaultView={
-            <DataTableDefaultView
-                icon={ShareMeIcon}
-                messages={['Your link list is empty.']} />
-        }/></div>;
-});
\ No newline at end of file
+        defaultViewIcon={ShareMeIcon}
+        defaultViewMessages={['Your link list is empty.']} />
+    </div>;
+});
