X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/46c5d0d6ab1e39af6a8c12a7d620e0b03cde8a53..2a7fd99c212c33a1ec9911f8529fa5afc59a7bb2:/src/views/run-process-panel/run-process-basic-form.tsx

diff --git a/src/views/run-process-panel/run-process-basic-form.tsx b/src/views/run-process-panel/run-process-basic-form.tsx
index 32a126a458..a6f7a70693 100644
--- a/src/views/run-process-panel/run-process-basic-form.tsx
+++ b/src/views/run-process-panel/run-process-basic-form.tsx
@@ -40,7 +40,7 @@ export const RunProcessBasicForm =
                         label="Optional description of this workflow run" />
                 </Grid>
                 <Grid item xs={12} md={6}>
-                    <ProjectInput input={{
+                    <ProjectInput required input={{
                         id: "owner",
                         label: "Project where the workflow will run"
                     } as ProjectCommandInputParameter}
