X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/400481f862c9de54569daabf9de167601dc887bc..36f8f69a5bf5c19ad3c8de57466944e2b7d0c390:/src/views/workbench/workbench.tsx

diff --git a/src/views/workbench/workbench.tsx b/src/views/workbench/workbench.tsx
index f26d50fba6..09435d096c 100644
--- a/src/views/workbench/workbench.tsx
+++ b/src/views/workbench/workbench.tsx
@@ -45,6 +45,8 @@ import { HomeTreePicker } from '~/views-components/projects-tree-picker/home-tre
 import { SharedTreePicker } from '~/views-components/projects-tree-picker/shared-tree-picker';
 import { FavoritesTreePicker } from '../../views-components/projects-tree-picker/favorites-tree-picker';
 import { ProjectsTreePicker } from '~/views-components/projects-tree-picker/projects-tree-picker';
+import { Chips } from '~/components/chips/chips';
+import { ChipsInput } from '../../components/chips-input/chips-input';
 
 type CssRules = 'root' | 'container' | 'splitter' | 'asidePanel' | 'contentWrapper' | 'content';
 
