X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/3f7e1a8afad27920adf8f03ce82eeb1ae58aa84f..47c824dd6472897b18738ad4b03dad5cf00e74bc:/src/views-components/process-runtime-status/process-runtime-status.tsx

diff --git a/src/views-components/process-runtime-status/process-runtime-status.tsx b/src/views-components/process-runtime-status/process-runtime-status.tsx
index 3b5fae3639..4761e12f4c 100644
--- a/src/views-components/process-runtime-status/process-runtime-status.tsx
+++ b/src/views-components/process-runtime-status/process-runtime-status.tsx
@@ -55,7 +55,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         whiteSpace: 'pre-line',
     },
     errorColor: {
-        color: theme.customs.colors.red900,
+        color: theme.customs.colors.grey700,
     },
     error: {
         backgroundColor: theme.customs.colors.red100,
@@ -65,7 +65,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         backgroundColor: theme.customs.colors.yellow100,
     },
     warningColor: {
-        color: theme.customs.colors.yellow900,
+        color: theme.customs.colors.grey700,
     },
     paperRoot: {
         minHeight: theme.spacing.unit * 6,
