X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0..8e6de8fb13348e6e0b0ab47d91ab65f99033e174:/src/views/run-process-panel/run-process-advanced-form.tsx

diff --git a/src/views/run-process-panel/run-process-advanced-form.tsx b/src/views/run-process-panel/run-process-advanced-form.tsx
index f5c4abf9ba..52abfe806a 100644
--- a/src/views/run-process-panel/run-process-advanced-form.tsx
+++ b/src/views/run-process-panel/run-process-advanced-form.tsx
@@ -44,13 +44,13 @@ export const RunProcessAdvancedForm =
                         <Grid item xs={12} md={6}>
                             <Field
                                 name={OUTPUT_FIELD}
-                                component={TextField}
+                                component={TextField as any}
                                 label="Output name" />
                         </Grid>
                         <Grid item xs={12} md={6}>
                             <Field
                                 name={RUNTIME_FIELD}
-                                component={TextField}
+                                component={TextField as any}
                                 helperText="Maximum running time (in seconds) that this container will be allowed to run before being cancelled."
                                 label="Runtime limit"
                                 parse={IntInput.parse}
@@ -61,7 +61,7 @@ export const RunProcessAdvancedForm =
                         <Grid item xs={12} md={6}>
                             <Field
                                 name={RAM_FIELD}
-                                component={TextField}
+                                component={TextField as any}
                                 label="RAM"
                                 helperText="Number of ram bytes to be used to run this process."
                                 parse={IntInput.parse}
@@ -73,7 +73,7 @@ export const RunProcessAdvancedForm =
                         <Grid item xs={12} md={6}>
                             <Field
                                 name={VCPUS_FIELD}
-                                component={TextField}
+                                component={TextField as any}
                                 label="VCPUs"
                                 helperText="Number of cores to be used to run this process."
                                 parse={IntInput.parse}
@@ -85,7 +85,7 @@ export const RunProcessAdvancedForm =
                         <Grid item xs={12} md={6}>
                             <Field
                                 name={KEEP_CACHE_RAM_FIELD}
-                                component={TextField}
+                                component={TextField as any}
                                 label="Keep cache RAM"
                                 helperText="Number of keep cache bytes to be used to run this process."
                                 parse={IntInput.parse}
@@ -96,7 +96,7 @@ export const RunProcessAdvancedForm =
                         <Grid item xs={12} md={6}>
                             <Field
                                 name={RUNNER_IMAGE_FIELD}
-                                component={TextField}
+                                component={TextField as any}
                                 label='Runner'
                                 required
                                 helperText='The container image with arvados-cwl-runner that will execute this workflow.' />
