X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0..2a7fd99c212c33a1ec9911f8529fa5afc59a7bb2:/src/views-components/form-fields/ssh-key-form-fields.tsx

diff --git a/src/views-components/form-fields/ssh-key-form-fields.tsx b/src/views-components/form-fields/ssh-key-form-fields.tsx
index b2274000f4..2121725845 100644
--- a/src/views-components/form-fields/ssh-key-form-fields.tsx
+++ b/src/views-components/form-fields/ssh-key-form-fields.tsx
@@ -10,7 +10,7 @@ import { SSH_KEY_PUBLIC_VALIDATION, SSH_KEY_NAME_VALIDATION } from "validators/v
 export const SshKeyPublicField = () =>
     <Field
         name='publicKey'
-        component={TextField}
+        component={TextField as any}
         validate={SSH_KEY_PUBLIC_VALIDATION}
         autoFocus={true}
         label="Public Key" />;
@@ -18,7 +18,7 @@ export const SshKeyPublicField = () =>
 export const SshKeyNameField = () =>
     <Field
         name='name'
-        component={TextField}
+        component={TextField as any}
         validate={SSH_KEY_NAME_VALIDATION}
         label="Name" />;
 
