X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/3b5edb7ae1de4709acef5d2c58ce12ecf5eb9fcf..663ddeefc6a120d6dba213b1392805146d659721:/src/views/keep-service-panel/keep-service-panel.tsx

diff --git a/src/views/keep-service-panel/keep-service-panel.tsx b/src/views/keep-service-panel/keep-service-panel.tsx
index a11cee0b22..369b7c2134 100644
--- a/src/views/keep-service-panel/keep-service-panel.tsx
+++ b/src/views/keep-service-panel/keep-service-panel.tsx
@@ -5,7 +5,6 @@
 import { RootState } from '~/store/store';
 import { Dispatch } from 'redux';
 import { connect } from 'react-redux';
-import { } from '~/store/keep-services/keep-services-actions';
 import { 
     KeepServicePanelRoot, 
     KeepServicePanelRootDataProps, 
