X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/378080d4edc6fff9c5eb7edffe034ae77c7269e9..29c142861ce9da3f1cdb8a4c01185842ba3bf2a6:/doc/user/reference/sdk-python.textile?ds=sidebyside

diff --git a/doc/user/reference/sdk-python.textile b/doc/user/reference/sdk-python.textile
index fe824ac5b4..288a9d5612 100644
--- a/doc/user/reference/sdk-python.textile
+++ b/doc/user/reference/sdk-python.textile
@@ -1,8 +1,9 @@
 ---
 layout: default
 navsection: userguide
+navmenu: Reference
 title: "Python SDK"
-navorder: 323
+navorder: 23
 ---
 
 h1. Reference: Python SDK
@@ -107,14 +108,6 @@ Many API methods accept a parameter whose name is the same as the resource type.
 </code></pre>
 </notextile>
 
-Currently, non-atom parameter values (hashes and lists) other than @body@ must be explicitly encoded using @json.dumps()@. (This will be fixed in a future release.)
-
-<notextile>
-<pre><code class="userinput">arvados.api('v1').links().list(
-    where=json.dumps({'link_class':'permission'})).execute()
-</code></pre>
-</notextile>
-
 One way to make API calls slightly less verbose is:
 
 <notextile>
