X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/3367b1ff2a1d1050bb435f7bc8230c03435b2529..e3d13624759c128c326b64e9e0e60996bd28aadf:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index edc472657e..37c1bd3745 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -19,4 +19,6 @@ export const COPY_FILE_VALIDATION = [require];
 
 export const MOVE_TO_VALIDATION = [require];
 
-export const PROCESS_NAME_VALIDATION = [require, maxLength(255)];
\ No newline at end of file
+export const PROCESS_NAME_VALIDATION = [require, maxLength(255)];
+
+export const REPOSITORY_NAME_VALIDATION = [require, maxLength(255)];
\ No newline at end of file
