X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/33608c44bf33ab330ad1267ab8d56c08634673b5..1f0d4a9c57515816112baa3cb45bf97bec490737:/src/views-components/details-panel/details-panel.tsx

diff --git a/src/views-components/details-panel/details-panel.tsx b/src/views-components/details-panel/details-panel.tsx
index 70c026d3d3..21d57aea48 100644
--- a/src/views-components/details-panel/details-panel.tsx
+++ b/src/views-components/details-panel/details-panel.tsx
@@ -48,7 +48,8 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         fontSize: '2.125rem'
     },
     headerTitle: {
-        wordBreak: 'break-all'
+        overflowWrap: 'break-word',
+        wordWrap: 'break-word'
     },
     tabContainer: {
         padding: theme.spacing.unit * 3
