X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/32e3370febf2e29c45e27065cdc14a883775f261..35d6c5a870aeff7bb2cbf6ec80d306debad872c1:/src/views/run-process-panel/inputs/directory-array-input.tsx

diff --git a/src/views/run-process-panel/inputs/directory-array-input.tsx b/src/views/run-process-panel/inputs/directory-array-input.tsx
index a7d83daef5..7b238832b0 100644
--- a/src/views/run-process-panel/inputs/directory-array-input.tsx
+++ b/src/views/run-process-panel/inputs/directory-array-input.tsx
@@ -11,7 +11,7 @@ import {
 } from '~/models/workflow';
 import { Field } from 'redux-form';
 import { ERROR_MESSAGE } from '~/validators/require';
-import { Input, Dialog, DialogTitle, DialogContent, DialogActions, Button, Divider, Grid, WithStyles, Typography } from '@material-ui/core';
+import { Input, Dialog, DialogTitle, DialogContent, DialogActions, Button, Divider, WithStyles, Typography } from '@material-ui/core';
 import { GenericInputProps, GenericInput } from './generic-input';
 import { ProjectsTreePicker } from '~/views-components/projects-tree-picker/projects-tree-picker';
 import { connect, DispatchProp } from 'react-redux';
