X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/31e84a9315728c2f58a26bf0e9e1d2b38326fb86..2a7fd99c212c33a1ec9911f8529fa5afc59a7bb2:/src/plugins/root-redirect/index.tsx

diff --git a/src/plugins/root-redirect/index.tsx b/src/plugins/root-redirect/index.tsx
index 13eeb9421e..ee6d51695d 100644
--- a/src/plugins/root-redirect/index.tsx
+++ b/src/plugins/root-redirect/index.tsx
@@ -2,10 +2,10 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import { PluginConfig } from '~/common/plugintypes';
+import { PluginConfig } from 'common/plugintypes';
 import { Dispatch } from 'redux';
-import { RootState } from '~/store/store';
-import { SidePanelTreeCategory } from '~/store/side-panel-tree/side-panel-tree-actions';
+import { RootState } from 'store/store';
+import { SidePanelTreeCategory } from 'store/side-panel-tree/side-panel-tree-actions';
 import { push } from "react-router-redux";
 
 export const register = (pluginConfig: PluginConfig, redirect: string) => {
