X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/2f857ebcd67a607b7fde9c0ea4808ac30c591876..d329bdf89ea30acc0e9a95bcb7bc4338f8beeebb:/src/views/main-panel/main-panel.tsx

diff --git a/src/views/main-panel/main-panel.tsx b/src/views/main-panel/main-panel.tsx
index 5009f12987..178db25c22 100644
--- a/src/views/main-panel/main-panel.tsx
+++ b/src/views/main-panel/main-panel.tsx
@@ -7,6 +7,7 @@ import { connect } from 'react-redux';
 import { MainPanelRoot, MainPanelRootDataProps } from '~/views/main-panel/main-panel-root';
 import { isSystemWorking } from '~/store/progress-indicator/progress-indicator-reducer';
 import { isWorkbenchLoading } from '~/store/workbench/workbench-actions';
+import { LinkAccountPanelStatus } from '~/store/link-account-panel/link-account-panel-reducer';
 
 const mapStateToProps = (state: RootState): MainPanelRootDataProps => {
     return {
@@ -14,7 +15,8 @@ const mapStateToProps = (state: RootState): MainPanelRootDataProps => {
         working: isSystemWorking(state.progressIndicator),
         loading: isWorkbenchLoading(state),
         buildInfo: state.appInfo.buildInfo,
-        uuidPrefix: state.auth.localCluster
+        uuidPrefix: state.auth.localCluster,
+        isNotLinking: state.linkAccountPanel.status === LinkAccountPanelStatus.INITIAL
     };
 };
 
