X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/2e95340d2e22752175518bc47ebb85d748685d9a..8d149b6d680e124f4079dfd5788ead5dbbc34c41:/doc/api/PipelineInstance.textile

diff --git a/doc/api/PipelineInstance.textile b/doc/api/PipelineInstance.textile
index 9b4c9a306c..2a646c97fd 100644
--- a/doc/api/PipelineInstance.textile
+++ b/doc/api/PipelineInstance.textile
@@ -1,6 +1,7 @@
 ---
 layout: default
 navsection: api
+navmenu: Schema
 title: "Resource: PipelineInstance"
 navorder: 101
 ---
