X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/2cfb56ef5060cbad461062690fad650f15c49731..64b25cb874d430f23d169606265c9534a52bdc6c:/src/views/workflow-panel/workflow-panel-view.tsx

diff --git a/src/views/workflow-panel/workflow-panel-view.tsx b/src/views/workflow-panel/workflow-panel-view.tsx
index cccdce8085..18a254bd36 100644
--- a/src/views/workflow-panel/workflow-panel-view.tsx
+++ b/src/views/workflow-panel/workflow-panel-view.tsx
@@ -111,7 +111,7 @@ export const workflowPanelColumns: DataColumns<string, WorkflowPanelFilter> = [
 ];
 
 export const WorkflowPanelView = (props: WorkflowPanelProps) => {
-    return <Grid container spacing={16}>
+    return <Grid container spacing={16} style={{minHeight: '500px'}}>
         <Grid item xs={6}>
             <DataExplorer
                 id={WORKFLOW_PANEL_ID}
@@ -127,4 +127,4 @@ export const WorkflowPanelView = (props: WorkflowPanelProps) => {
             </Paper>
         </Grid>
     </Grid>;
-};
\ No newline at end of file
+};
