X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/282b04b762cf6366209074333bfd623e3cba58c5..9a29063c1833eb300da899559bc322e7bca50f97:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index a3f5df2e22..9bc76419ff 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -21,9 +21,13 @@ export const COPY_FILE_VALIDATION = [require];
 export const MOVE_TO_VALIDATION = [require];
 
 export const PROCESS_NAME_VALIDATION = [require, maxLength(255)];
+export const PROCESS_DESCRIPTION_VALIDATION = [maxLength(255)];
 
 export const REPOSITORY_NAME_VALIDATION = [require, maxLength(255)];
 
+export const USER_EMAIL_VALIDATION = [require, maxLength(255)];
+export const USER_LENGTH_VALIDATION = [maxLength(255)];
+
 export const SSH_KEY_PUBLIC_VALIDATION = [require, isRsaKey, maxLength(1024)];
 export const SSH_KEY_NAME_VALIDATION = [require, maxLength(255)];
 
