X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/26e9e3a95aa7e99c9b15a0181e972f75781169b9..59329caeae17903b97b90b167df5a8122a0c9d95:/src/views/process-panel/subprocesses-card.tsx

diff --git a/src/views/process-panel/subprocesses-card.tsx b/src/views/process-panel/subprocesses-card.tsx
index 0607c4711e..9cff1e9816 100644
--- a/src/views/process-panel/subprocesses-card.tsx
+++ b/src/views/process-panel/subprocesses-card.tsx
@@ -16,7 +16,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         height: '100%'
     },
     title: {
-        color: theme.customs.colors.grey700
+        color: theme.palette.grey["700"]
     },
     gridFilter: {
         height: '20px',
