X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/25aa8a7c81609525d300f38bc5b7d2344c4e1cdf..d76f55579538b82952dc94b46ca9badfb544bea4:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index edd0782294..edc472657e 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -9,8 +9,14 @@ export const TAG_KEY_VALIDATION = [require, maxLength(255)];
 export const TAG_VALUE_VALIDATION = [require, maxLength(255)];
 
 export const PROJECT_NAME_VALIDATION = [require, maxLength(255)];
-export const PROJECT_DESCRIPTION_VALIDATION = [maxLength(255)];
 
 export const COLLECTION_NAME_VALIDATION = [require, maxLength(255)];
 export const COLLECTION_DESCRIPTION_VALIDATION = [maxLength(255)];
-export const COLLECTION_PROJECT_VALIDATION = [require];
\ No newline at end of file
+export const COLLECTION_PROJECT_VALIDATION = [require];
+
+export const COPY_NAME_VALIDATION = [require, maxLength(255)];
+export const COPY_FILE_VALIDATION = [require];
+
+export const MOVE_TO_VALIDATION = [require];
+
+export const PROCESS_NAME_VALIDATION = [require, maxLength(255)];
\ No newline at end of file
