X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..ad06ff12da24dae2a9b206d6f88dcfe7704bfbb3:/src/views-components/dialog-move/dialog-move-to.tsx

diff --git a/src/views-components/dialog-move/dialog-move-to.tsx b/src/views-components/dialog-move/dialog-move-to.tsx
index bd097c6f1b..26ad56917a 100644
--- a/src/views-components/dialog-move/dialog-move-to.tsx
+++ b/src/views-components/dialog-move/dialog-move-to.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { memoize } from 'lodash/fp';
 import { InjectedFormProps, Field } from 'redux-form';
 import { WithDialogProps } from 'store/dialog/with-dialog';
