X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/25216cc7acedc987c26a159f0b640210c0ef101e..4dd738fa98e3726fcd99a37e334b5ea8db4e5ee0:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 22fed902d1..fe5dff8a48 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -2,8 +2,8 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
-import * as ReactDOM from 'react-dom';
+import React from 'react';
+import ReactDOM from 'react-dom';
 import { WorkbenchPanel } from './workbench';
 import { Provider } from "react-redux";
 import { configureStore } from "store/store";
@@ -14,6 +14,8 @@ import { CustomTheme } from 'common/custom-theme';
 import { createServices } from "services/services";
 import 'jest-localstorage-mock';
 
+jest.mock('views-components/baner/banner', () => ({ Banner: () => 'Banner' }))
+
 const history = createBrowserHistory();
 
 it('renders without crashing', () => {
