X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/2508b089d2369bf57811f9f96c14c2ee22dd664f..4d892bd66c5d11d8cbde42348099e92da0c21a99:/services/workbench2/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx

diff --git a/services/workbench2/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx b/services/workbench2/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx
index 854f3f4f68..a76ab0f6d0 100644
--- a/services/workbench2/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx
+++ b/services/workbench2/src/views-components/repositories-sample-git-dialog/repositories-sample-git-dialog.tsx
@@ -64,7 +64,7 @@ export const RepositoriesSampleGitDialog = compose(
                         color='primary'
                         onClick={props.closeDialog}>
                         Close
-                </Button>
+                    </Button>
                 </DialogActions>
             </Dialog>
     );
