X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/22cfdad7a451f67b0b4c195b58815cdf2abcfda9..eeb82d50816250cc6287928e6d958affa73880ee:/src/views/workbench/workbench.test.tsx

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index b1657bc35f..7b9b74d095 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -14,7 +14,7 @@ const history = createBrowserHistory();
 
 it('renders without crashing', () => {
     const div = document.createElement('div');
-    const store = configureStore({ projects: [], router: { location: null } }, createBrowserHistory());
+    const store = configureStore({ projects: [], router: { location: null }, auth: {} }, createBrowserHistory());
     ReactDOM.render(
         <Provider store={store}>
             <ConnectedRouter history={history}>
