X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/21abfcbaba4e8e735f353a1e3b030dd5dae8465b..09eb09cec6185c482a0e4f98f6b432c93990d3d8:/src/index.tsx

diff --git a/src/index.tsx b/src/index.tsx
index 522d8dc1ee..43cfb5fb03 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -122,7 +122,8 @@ fetchConfig()
                                 ? error.errors[0]
                                 : error.message}`,
                             kind: SnackbarKind.ERROR,
-                            hideDuration: 8000})
+                            hideDuration: 8000
+                        })
                         );
                     }
                 }
