X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/1bd016d1f30c72353e5e3b086dd9778b74efb516..c4b35e715ff5c6840aabfb76b540e2fad341b0ec:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index 389e8cdfd1..95edadfdd1 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -15,4 +15,7 @@ export const COLLECTION_NAME_VALIDATION = [require, maxLength(255)];
 export const COLLECTION_DESCRIPTION_VALIDATION = [maxLength(255)];
 export const COLLECTION_PROJECT_VALIDATION = [require];
 
-export const MOVE_TO_VALIDATION = [require];
\ No newline at end of file
+export const COPY_NAME_VALIDATION = [require, maxLength(255)];
+export const COPY_FILE_VALIDATION = [require];
+
+export const MOVE_TO_VALIDATION = [require];
