X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/1b1b93efdc7ae33d33d63302583b59c6900d7c7a..b71cb584942873132af6df8bc65ae28e35f13065:/src/views/process-panel/process-log-card.tsx

diff --git a/src/views/process-panel/process-log-card.tsx b/src/views/process-panel/process-log-card.tsx
index 4890c726f4..e14f98f9b2 100644
--- a/src/views/process-panel/process-log-card.tsx
+++ b/src/views/process-panel/process-log-card.tsx
@@ -62,11 +62,12 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     },
     title: {
         overflow: 'hidden',
-        paddingTop: theme.spacing.unit * 0.5
+        paddingTop: theme.spacing.unit * 0.5,
+        color: theme.customs.colors.greyD
     },
     iconHeader: {
         fontSize: '1.875rem',
-        color: theme.customs.colors.green700
+        color: theme.customs.colors.greyL
     },
     root: {
         height: '100%',
