X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/1a98070dcdd379ab6effdc3fc4301c9435a137b1..fc69579b197cb963209111620f0a908c7811e1db:/services/api/db/structure.sql

diff --git a/services/api/db/structure.sql b/services/api/db/structure.sql
index 66b41cba6a..0eef6b4b65 100644
--- a/services/api/db/structure.sql
+++ b/services/api/db/structure.sql
@@ -3,7 +3,6 @@
 --
 
 SET statement_timeout = 0;
-SET lock_timeout = 0;
 SET client_encoding = 'UTF8';
 SET standard_conforming_strings = on;
 SET check_function_bodies = false;
