X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/1933452553965a2066191eccaaa40943d6d5c5d8..8a057a6a69f4182cd3adc67c7d1071832ffeaa0b:/src/components/breadcrumbs/breadcrumbs.test.tsx

diff --git a/src/components/breadcrumbs/breadcrumbs.test.tsx b/src/components/breadcrumbs/breadcrumbs.test.tsx
index ef3f888797..ea3d5ac21e 100644
--- a/src/components/breadcrumbs/breadcrumbs.test.tsx
+++ b/src/components/breadcrumbs/breadcrumbs.test.tsx
@@ -6,7 +6,7 @@ import * as React from "react";
 import { mount, configure } from "enzyme";
 
 import * as Adapter from "enzyme-adapter-react-16";
-import Breadcrumbs from "./breadcrumbs";
+import { Breadcrumbs } from "./breadcrumbs";
 import { Button } from "@material-ui/core";
 import ChevronRightIcon from '@material-ui/icons/ChevronRight';
 
@@ -50,4 +50,4 @@ describe("<Breadcrumbs />", () => {
     });
 
 
-});
\ No newline at end of file
+});
