X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/180c2c37b635cbb7a33257d2ee9b4395553ce5e7..8a057a6a69f4182cd3adc67c7d1071832ffeaa0b:/src/components/data-table-filters/data-table-filters.test.tsx

diff --git a/src/components/data-table-filters/data-table-filters.test.tsx b/src/components/data-table-filters/data-table-filters.test.tsx
index b0a84b5176..9a3fa4dc5c 100644
--- a/src/components/data-table-filters/data-table-filters.test.tsx
+++ b/src/components/data-table-filters/data-table-filters.test.tsx
@@ -4,7 +4,7 @@
 
 import * as React from "react";
 import { mount, configure } from "enzyme";
-import { DataTableFilters, DataTableFilterItem } from "./data-table-filters";
+import { DataTableFilters } from "./data-table-filters";
 import * as Adapter from 'enzyme-adapter-react-16';
 import { Checkbox, ButtonBase, ListItem, Button, ListItemText } from "@material-ui/core";
 
