X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/1534032e710b57106297576edb28e84b652a76f0..4f1696f1ad1544981a6492071bd168c7dd34f839:/src/views/process-log-panel/process-log-main-card.tsx

diff --git a/src/views/process-log-panel/process-log-main-card.tsx b/src/views/process-log-panel/process-log-main-card.tsx
index 7ac40c0cc6..626568d179 100644
--- a/src/views/process-log-panel/process-log-main-card.tsx
+++ b/src/views/process-log-panel/process-log-main-card.tsx
@@ -16,7 +16,6 @@ import { ArvadosTheme } from '~/common/custom-theme';
 import { CodeSnippetDataProps } from '~/components/code-snippet/code-snippet';
 import { BackIcon } from '~/components/icon/icon';
 import { DefaultView } from '~/components/default-view/default-view';
-import { openContextMenu } from '../../store/context-menu/context-menu-actions';
 
 type CssRules = 'backLink' | 'backIcon' | 'card' | 'title' | 'iconHeader' | 'link';
 
