X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/1072269cec78f75ec8995afab82d0faaa485f5da..47c824dd6472897b18738ad4b03dad5cf00e74bc:/src/views-components/virtual-machines-dialog/group-array-input.tsx

diff --git a/src/views-components/virtual-machines-dialog/group-array-input.tsx b/src/views-components/virtual-machines-dialog/group-array-input.tsx
index 95a8642079..cba9af636e 100644
--- a/src/views-components/virtual-machines-dialog/group-array-input.tsx
+++ b/src/views-components/virtual-machines-dialog/group-array-input.tsx
@@ -46,7 +46,6 @@ const styles = (theme: ArvadosTheme) => ({
 });
 
 export const GroupArrayInput = ({name, input, setPartialGroupInput, hasPartialGroupInput}: GroupArrayInputProps & GroupArrayDataProps) => {
-  console.log(hasPartialGroupInput);
   return <GroupArrayField
       name={name}
       commandInput={input}
