X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/0d9ecf118b578f86fc3ef0f8cbb1c200b0954edc..04704ea80b294655fe14d0c8cddf4ec1a6b21b4d:/services/workbench2/src/store/multiselect/multiselect-reducer.tsx?ds=sidebyside

diff --git a/services/workbench2/src/store/multiselect/multiselect-reducer.tsx b/services/workbench2/src/store/multiselect/multiselect-reducer.tsx
index 9bcb46d018..b488932f0b 100644
--- a/services/workbench2/src/store/multiselect/multiselect-reducer.tsx
+++ b/services/workbench2/src/store/multiselect/multiselect-reducer.tsx
@@ -9,7 +9,7 @@ type MultiselectToolbarState = {
     isVisible: boolean;
     checkedList: TCheckedList;
     selectedUuid: string;
-    disabledButtons: string[]
+    disabledButtons: string[];
 };
 
 const multiselectToolbarInitialState = {
