X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/0d85dd75361bfab5e90479aa85fb4782860e636e..d9506e8ac1add07732c64ca923468465ca96007b:/services/workbench2/src/views-components/side-panel/side-panel-collapsed.tsx

diff --git a/services/workbench2/src/views-components/side-panel/side-panel-collapsed.tsx b/services/workbench2/src/views-components/side-panel/side-panel-collapsed.tsx
index 9948ace35d..4ac91f4feb 100644
--- a/services/workbench2/src/views-components/side-panel/side-panel-collapsed.tsx
+++ b/services/workbench2/src/views-components/side-panel/side-panel-collapsed.tsx
@@ -119,9 +119,7 @@ const mapStateToProps = ({auth, properties }: RootState) => {
         return {
             user: auth.user,
             selectedPath: properties.breadcrumbs
-                ? properties.breadcrumbs[0].label !== 'Virtual Machines'
                 ? properties.breadcrumbs[0].label
-                : SidePanelCollapsedCategory.SHELL_ACCESS
                 : SidePanelCollapsedCategory.PROJECTS,
         }
 }
