X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/09e3c7102376790a2a6bebb0c77f43fa271f6d74..2bec2ba1ce3b37fb8ff9a94f20d6c8a694d87183:/services/api/db/structure.sql

diff --git a/services/api/db/structure.sql b/services/api/db/structure.sql
index 2d0c76f09d..aa05031fe0 100644
--- a/services/api/db/structure.sql
+++ b/services/api/db/structure.sql
@@ -3,6 +3,7 @@
 --
 
 SET statement_timeout = 0;
+SET lock_timeout = 0;
 SET client_encoding = 'UTF8';
 SET standard_conforming_strings = on;
 SET check_function_bodies = false;
