X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/095e176632bbf81d28a239742a1ecce12404bd2d..e98e166ceab6e377036fc87ce31e4d0d5238994f:/services/workbench2/src/views/not-found-panel/not-found-panel-root.tsx

diff --git a/services/workbench2/src/views/not-found-panel/not-found-panel-root.tsx b/services/workbench2/src/views/not-found-panel/not-found-panel-root.tsx
index e5d8507b5c..cad98470da 100644
--- a/services/workbench2/src/views/not-found-panel/not-found-panel-root.tsx
+++ b/services/workbench2/src/views/not-found-panel/not-found-panel-root.tsx
@@ -81,8 +81,8 @@ export const NotFoundPanelRoot = withStyles(styles)(
                 <p>
                     The page you requested was not found,&nbsp;
                     {
-                        !!clusterConfig.Mail && clusterConfig.Mail.SupportEmailAddress ?
-                            getEmailLink(clusterConfig.Mail.SupportEmailAddress, classes) :
+                        !!clusterConfig.Users && clusterConfig.Users.SupportEmailAddress ?
+                            getEmailLink(clusterConfig.Users.SupportEmailAddress, classes) :
                             'email us'
                     }
                     &nbsp;if you suspect this is a bug.
