X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/095e176632bbf81d28a239742a1ecce12404bd2d..96f0b43ee4bb07e87dbeef8514a51857db069351:/services/workbench2/src/views-components/side-panel-toggle/side-panel-toggle.tsx

diff --git a/services/workbench2/src/views-components/side-panel-toggle/side-panel-toggle.tsx b/services/workbench2/src/views-components/side-panel-toggle/side-panel-toggle.tsx
index 47d34216cc..a7ec9d7d61 100644
--- a/services/workbench2/src/views-components/side-panel-toggle/side-panel-toggle.tsx
+++ b/services/workbench2/src/views-components/side-panel-toggle/side-panel-toggle.tsx
@@ -27,6 +27,7 @@ const SidePanelToggle = (props: collapseButtonProps) => {
         },
         icon: {
             opacity: '0.5',
+            marginBottom: '0.54rem'
         },
     }
 
