X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/095e176632bbf81d28a239742a1ecce12404bd2d..7f0f12c40238f3eb12a51877a755cf22357e0767:/services/workbench2/src/views/user-panel/user-panel.tsx

diff --git a/services/workbench2/src/views/user-panel/user-panel.tsx b/services/workbench2/src/views/user-panel/user-panel.tsx
index 950262d8c6..f76785009d 100644
--- a/services/workbench2/src/views/user-panel/user-panel.tsx
+++ b/services/workbench2/src/views/user-panel/user-panel.tsx
@@ -150,7 +150,8 @@ export const UserPanel = compose(
                             elevation: 0,
                         }}
                         defaultViewIcon={ShareMeIcon}
-                        defaultViewMessages={['Your user list is empty.']} />
+                        defaultViewMessages={['Your user list is empty.']}
+                        forceMultiSelectMode />
                 </Paper>;
             }
 
