X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/066c2178f99f8fb5c818bc453b49ba8341d440a6..da1b362fc33261ace42851f6900df7b96fde819e:/src/validators/validators.tsx

diff --git a/src/validators/validators.tsx b/src/validators/validators.tsx
index b781a3a97f..87a4c1f57e 100644
--- a/src/validators/validators.tsx
+++ b/src/validators/validators.tsx
@@ -8,8 +8,8 @@ import { isRsaKey } from './is-rsa-key';
 import { isRemoteHost } from "./is-remote-host";
 import { validFilePath, validName, validNameAllowSlash } from "./valid-name";
 
-export const TAG_KEY_VALIDATION = [require, maxLength(255)];
-export const TAG_VALUE_VALIDATION = [require, maxLength(255)];
+export const TAG_KEY_VALIDATION = [maxLength(255)];
+export const TAG_VALUE_VALIDATION = [maxLength(255)];
 
 export const PROJECT_NAME_VALIDATION = [require, validName, maxLength(255)];
 export const PROJECT_NAME_VALIDATION_ALLOW_SLASH = [require, validNameAllowSlash, maxLength(255)];
@@ -32,6 +32,7 @@ export const REPOSITORY_NAME_VALIDATION = [require, maxLength(255)];
 
 export const USER_EMAIL_VALIDATION = [require, maxLength(255)];
 export const PROFILE_EMAIL_VALIDATION = [maxLength(255)];
+export const PROFILE_URL_VALIDATION = [maxLength(255)];
 export const USER_LENGTH_VALIDATION = [maxLength(255)];
 
 export const SSH_KEY_PUBLIC_VALIDATION = [require, isRsaKey, maxLength(1024)];
