X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/034bf8ad6df6c47d3c392ae8233c8d08dc6b4609..56e6dc7af513fd7bdb043e9c74a1d2848da41c38:/src/views/process-panel/process-panel-root.tsx

diff --git a/src/views/process-panel/process-panel-root.tsx b/src/views/process-panel/process-panel-root.tsx
index ed808b361a..388dc74658 100644
--- a/src/views/process-panel/process-panel-root.tsx
+++ b/src/views/process-panel/process-panel-root.tsx
@@ -18,7 +18,7 @@ import { getProcessPanelLogs, ProcessLogsPanel } from 'store/process-logs-panel/
 import { ProcessLogsCard } from './process-log-card';
 import { FilterOption } from 'views/process-panel/process-log-form';
 import { getInputCollectionMounts } from 'store/processes/processes-actions';
-import { CommandInputParameter } from 'models/workflow';
+import { WorkflowInputsData } from 'models/workflow';
 import { CommandOutputParameter } from 'cwlts/mappings/v1.0/CommandOutputParameter';
 import { AuthState } from 'store/auth/auth-reducer';
 import { ProcessCmdCard } from './process-cmd-card';
@@ -39,7 +39,7 @@ export interface ProcessPanelRootDataProps {
     filters: Array<SubprocessFilterDataProps>;
     processLogsPanel: ProcessLogsPanel;
     auth: AuthState;
-    inputRaw: CommandInputParameter[] | null;
+    inputRaw: WorkflowInputsData | null;
     inputParams: ProcessIOParameter[] | null;
     outputRaw: OutputDetails | null;
     outputDefinitions: CommandOutputParameter[];
