X-Git-Url: https://git.arvados.org/arvados.git/blobdiff_plain/019459c71713b979cb4cc34ec3a91a947d2c235a..32e3370febf2e29c45e27065cdc14a883775f261:/src/views/run-process-panel/inputs/generic-input.tsx

diff --git a/src/views/run-process-panel/inputs/generic-input.tsx b/src/views/run-process-panel/inputs/generic-input.tsx
index a449c657ff..066bf2b855 100644
--- a/src/views/run-process-panel/inputs/generic-input.tsx
+++ b/src/views/run-process-panel/inputs/generic-input.tsx
@@ -4,8 +4,8 @@
 
 import * as React from 'react';
 import { WrappedFieldProps } from 'redux-form';
-import { FormGroup, FormLabel, Input, FormHelperText, FormControl } from '@material-ui/core';
-import { GenericCommandInputParameter, getInputLabel, isRequiredInput } from '../../../models/workflow';
+import { FormGroup, FormLabel, FormHelperText } from '@material-ui/core';
+import { GenericCommandInputParameter, getInputLabel, isRequiredInput } from '~/models/workflow';
 
 export type GenericInputProps = WrappedFieldProps & {
     commandInput: GenericCommandInputParameter<any, any>;
