---
layout: default
navsection: userguide
navmenu: Getting Started
title: Accessing Arvados Workbench
navorder: 1
---
h1. Accessing Arvados Workbench

Access the Arvados beta test instance available using this link:

"https://workbench.{{ site.arvados_api_host }}/":https://workbench.{{ site.arvados_api_host }}/

If you are accessing Arvados for the first time, you will be asked to log in using a Google account.  Arvados uses Google services only for identification, and will never access any personal information.  Once you are logged in, the Workbench page may indicate your account status is *New / inactive*.  If this is the case, contact the administrator of the Arvados instance to activate your account.

Once your account is active, logging in to the Workbench will present you with a system status dashboard.  This gives a summary of data, configuration, and activity in the Arvados instance.

Next, we will "configure your account for ssh access to an Arvados virtual machine (VM).":ssh-access.html
