X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/fd24fbe43ef6f898f31804aff16ea6911a014ff8..90a80294d2f10e5aa9b7f33adc760ce55bbf4f04:/src/views/process-panel/process-panel-root.tsx

diff --git a/src/views/process-panel/process-panel-root.tsx b/src/views/process-panel/process-panel-root.tsx
index 28d2e978..adb6c920 100644
--- a/src/views/process-panel/process-panel-root.tsx
+++ b/src/views/process-panel/process-panel-root.tsx
@@ -163,7 +163,7 @@ export const ProcessPanelRoot = withStyles(styles)(
                         outputUuid={outputUuid || ""}
                     />
                 </MPVPanelContent>
-                <MPVPanelContent forwardProps xs maxHeight='50%' data-cy="process-resources">
+                <MPVPanelContent forwardProps xs data-cy="process-resources">
                     <ProcessResourceCard
                         process={process}
                         nodeInfo={nodeInfo}
