X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/fc3d9ac09fbb1cdc4fb4b00f2f704795ad365110..0efebb152c5b21d3d1d58a2a27058c1e661342b9:/src/views/process-log-panel/process-log-form.tsx

diff --git a/src/views/process-log-panel/process-log-form.tsx b/src/views/process-log-panel/process-log-form.tsx
index 4b6cbe56..eab9fe1d 100644
--- a/src/views/process-log-panel/process-log-form.tsx
+++ b/src/views/process-log-panel/process-log-form.tsx
@@ -35,7 +35,7 @@ export const ProcessLogForm = withStyles(styles)(
                 </InputLabel>
                 <Select
                     value={selectedFilter.value}
-                    onChange={event => onChange}
+                    onChange={({ target }) => onChange({ label: target.innerText, value: target.value })}
                     input={<Input name="eventType" id="log-label-placeholder" />}
                     name="eventType">
                     {
