X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/fa9b3ce44a3a9315207852d1f182000a6166f9e9..71b9264c1720e619f8cfcb297a7848ece420c61c:/src/views/process-log-panel/process-log-main-card.tsx

diff --git a/src/views/process-log-panel/process-log-main-card.tsx b/src/views/process-log-panel/process-log-main-card.tsx
index 42df2d92..9b75d112 100644
--- a/src/views/process-log-panel/process-log-main-card.tsx
+++ b/src/views/process-log-panel/process-log-main-card.tsx
@@ -80,7 +80,7 @@ export const ProcessLogMainCard = withStyles(styles)(
                         </Tooltip>}
                     title={
                         <Tooltip title={process.containerRequest.name} placement="bottom-start">
-                            <Typography noWrap variant="title" className={classes.title}>
+                            <Typography noWrap variant='h6' className={classes.title}>
                                 {process.containerRequest.name}
                             </Typography>
                         </Tooltip>}
