X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/f5127724c5ca39a59a08ba20f843e530b0650be9..4bb9d50b428773c4712e8eebdb6756f45efb06f6:/src/components/select-field/select-field.tsx?ds=sidebyside

diff --git a/src/components/select-field/select-field.tsx b/src/components/select-field/select-field.tsx
index dda58c08..1c3dec35 100644
--- a/src/components/select-field/select-field.tsx
+++ b/src/components/select-field/select-field.tsx
@@ -14,7 +14,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         width: '100%'
     },
     selectWrapper: {
-        backgroundColor: 'white',
+        backgroundColor: theme.palette.common.white,
         '&:before': {
             borderBottomColor: 'rgba(0, 0, 0, 0.42)'
         },
@@ -30,7 +30,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     },
     option: {
         fontSize: '0.875rem',
-        backgroundColor: 'white',
+        backgroundColor: theme.palette.common.white,
         height: '30px'
     }
 });
