X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/f239b9e88677d82a48b6b565ab2fd407d1171729..e63198a93d7b537ffbb68b8210c99f76041fd112:/src/views/workbench/workbench.test.tsx?ds=sidebyside

diff --git a/src/views/workbench/workbench.test.tsx b/src/views/workbench/workbench.test.tsx
index 48ea2de9..8e0b353f 100644
--- a/src/views/workbench/workbench.test.tsx
+++ b/src/views/workbench/workbench.test.tsx
@@ -17,7 +17,7 @@ const history = createBrowserHistory();
 
 it('renders without crashing', () => {
     const div = document.createElement('div');
-    const store = configureStore(createBrowserHistory(), createServices());
+    const store = configureStore(createBrowserHistory(), createServices("/arvados/v1"));
     ReactDOM.render(
         <MuiThemeProvider theme={CustomTheme}>
             <Provider store={store}>
